<!-- Code generated from the comments of the CustomerEncryptionKey struct in builder/googlecompute/config.go; DO NOT EDIT MANUALLY -->

- `kmsKeyName` (string) - KmsKeyName: The name of the encryption key that is stored in Google
  Cloud KMS.

- `rawKey` (string) - RawKey: Specifies a 256-bit customer-supplied encryption key, encoded
  in RFC 4648 base64 to either encrypt or decrypt this resource.
