<!-- Code generated from the comments of the RunConfig struct in builder/openstack/run_config.go; DO NOT EDIT MANUALLY -->

- `ssh_interface` (string) - The type of interface to connect via SSH. Values useful for Rackspace
  are "public" or "private", and the default behavior is to connect via
  whichever is returned first from the OpenStack API.

- `ssh_ip_version` (string) - The IP version to use for SSH connections, valid values are `4` and `6`.
  Useful on dual stacked instances where the default behavior is to
  connect via whichever IP address is returned first from the OpenStack
  API.

- `external_source_image_format` (string) - The format of the external source image to use, e.g. qcow2, raw.

- `external_source_image_properties` (map[string]string) - Properties to set for the external source image

- `availability_zone` (string) - The availability zone to launch the server in. If this isn't specified,
  the default enforced by your OpenStack cluster will be used. This may be
  required for some OpenStack clusters.

- `rackconnect_wait` (bool) - For rackspace, whether or not to wait for Rackconnect to assign the
  machine an IP address before connecting via SSH. Defaults to false.

- `floating_ip_network` (string) - The ID or name of an external network that can be used for creation of a
  new floating IP.

- `instance_floating_ip_net` (string) - The ID of the network to which the instance is attached and which should
  be used to associate with the floating IP. This provides control over
  the floating ip association on multi-homed instances. The association
  otherwise depends on a first-returned-interface policy which could fail
  if the network to which it is connected is unreachable from the floating
  IP network.

- `floating_ip` (string) - A specific floating IP to assign to this instance.

- `reuse_ips` (bool) - Whether or not to attempt to reuse existing unassigned floating ips in
  the project before allocating a new one. Note that it is not possible to
  safely do this concurrently, so if you are running multiple openstack
  builds concurrently, or if other processes are assigning and using
  floating IPs in the same openstack project while packer is running, you
  should not set this to true. Defaults to false.

- `security_groups` ([]string) - A list of security groups by name to add to this instance.

- `networks` ([]string) - A list of networks by UUID to attach to this instance.

- `ports` ([]string) - A list of ports by UUID to attach to this instance.

- `network_discovery_cidrs` ([]string) - A list of network CIDRs to discover the network to attach to this instance.
  The first network whose subnet is contained within any of the given CIDRs
  is used. Ignored if either of the above two options are provided.

- `user_data` (string) - User data to apply when launching the instance. Note that you need to be
  careful about escaping characters due to the templates being JSON. It is
  often more convenient to use user_data_file, instead. Packer will not
  automatically wait for a user script to finish before shutting down the
  instance this must be handled in a provisioner.

- `user_data_file` (string) - Path to a file that will be used for the user data when launching the
  instance.

- `instance_name` (string) - Name that is applied to the server instance created by Packer. If this
  isn't specified, the default is same as image_name.

- `instance_metadata` (map[string]string) - Metadata that is applied to the server instance created by Packer. Also
  called server properties in some documentation. The strings have a max
  size of 255 bytes each.

- `force_delete` (bool) - Whether to force the OpenStack instance to be forcefully deleted. This
  is useful for environments that have reclaim / soft deletion enabled. By
  default this is false.

- `config_drive` (bool) - Whether or not nova should use ConfigDrive for cloud-init metadata.

- `floating_ip_pool` (string) - Deprecated use floating_ip_network instead.

- `use_blockstorage_volume` (bool) - Use Block Storage service volume for the instance root volume instead of
  Compute service local volume (default).

- `volume_name` (string) - Name of the Block Storage service volume. If this isn't specified,
  random string will be used.

- `volume_type` (string) - Type of the Block Storage service volume. If this isn't specified, the
  default enforced by your OpenStack cluster will be used.

- `volume_size` (int) - Size of the Block Storage service volume in GB. If this isn't specified,
  it is set to source image min disk value (if set) or calculated from the
  source image bytes size. Note that in some cases this needs to be
  specified, if use_blockstorage_volume is true.

- `volume_availability_zone` (string) - Availability zone of the Block Storage service volume. If omitted,
  Compute instance availability zone will be used. If both of Compute
  instance and Block Storage volume availability zones aren't specified,
  the default enforced by your OpenStack cluster will be used.

- `openstack_provider` (string) - Not really used, but here for BC

- `use_floating_ip` (bool) - *Deprecated* use `floating_ip` or `floating_ip_pool` instead.

<!-- End of code generated from the comments of the RunConfig struct in builder/openstack/run_config.go; -->
